Vbe Vbe

-V COM +V

E E

NPN

PNP

E B C E B C

E B C

E B C

10K1% 10K1%

49K91%

1458

2N3904

2N3906

10K1% 10K1% x x

49K91%

10K1%

+

- +

-

10K1%